------------------------  MORE - External DOS Command  -------------------------

MORE halts display scrolling when the screen is full.

FORMAT:   MORE

REMARKS:

   MORE is used with "piping" or "redirection" to achieve its function.  The
   message "--More--" appears on the bottom line when the screen is full, and
   the system is halted until any key is pressed.

NOTE:  In DOS Version 3 you may preface MORE with the drive letter and directory
   path, [d:][path], where the command file can be found.

EXAMPLES:

Display the contents of the current directory on the current drive one full
screen at a time:

          DIR | MORE


Display the contents of MYFILE.TXT one full screen at a time:

          MORE < MYFILE.TXT     or     TYPE MYFILE.TXT | MORE
